bench-speed +RTS -p -h 27,628,673,177 bytes x seconds Thu Dec 2 00:03 2021

seconds

0.0 5.0 10.0 15.0 20.0 25.0 30.0 35.0 bytes

0M

200M

400M

600M

800M

1,000M

1,200M

(35733)xs4/CAF:xs4

(35702)fastFromList/whnf/fro...

(37542)stack/whnf/stackB/run...

(35793)fastFromList/nf/fromL...

(35713)fastFromList/whnf/fro...

(35745)xs5/CAF:xs5

(37507)catPattBig/CAF:catPattBig

(30609)xs6/CAF:xs6